USE [DataPRO]
GO

INSERT INTO [dbo].[DefaultProperties]
           ([PropertyId]
           ,[PropertyName]
           ,[DefaultValue])
     VALUES
           (306
           ,'DefaultSensorCalibrationBehavior'
           ,'NonLinearIfAvailable')
GO


