﻿ALTER TABLE dbo.TestSetups
ADD MeasureSquibResistancesStep bit NULL;

ALTER TABLE [dbo].[TestSetups]
        ADD [NumberOfEvents] Int NOT NULL
        CONSTRAINT [DF_TestSetups_NumberOfEvents]
        DEFAULT (100)