INSERT INTO [dbo].[DAS] (
[SerialNumber], 
[Type], 
[MaxModules], 
[MaxMemory], 
[MaxSampleRate], 
[MinSampleRate], 
[FirmwareVersion], 
[CalDate], 
[ProtocolVersion], 
[LastModified], 
[LastModifiedBy], 
[Version], 
[LocalOnly], 
[LastUsed], 
[LastUsedBy], 
[Connection], 
[Channels], 
[Position], 
[ChannelTypes], 
[Reprogramable], 
[Reconfigurable],
[IsModule], 
[PositionOnDistributor], 
[PositionOnChain], 
[Port], 
[ParentDAS]) 
VALUES ('SLICE Mini Distributor Prototype', 
39, 
0, 
0, 
4294967295, 
0, 
'00A6', 
'2016-04-07 16:03:30.017', 
4, 
'2019-11-18 00:00:00.000', 
'DATAPRO_SYSTEM', 
1, 
0, 
'1970-01-01 00:00:00.000', 
'', 
'192.168.0.10', 
0, 
'Prototype', 
'', 
0, 
0, 
0, 
0, 
0, 
0, 
'')