﻿ALTER TABLE dbo.TestSetups
ADD ClockSyncProfileMaster nvarchar(50) NOT NULL
CONSTRAINT TestSetupsClockSyncProfileMaster_Constraint
DEFAULT 'None'
WITH VALUES;

ALTER TABLE dbo.TestSetups
ADD ClockSyncProfileSlave nvarchar(50) NOT NULL
CONSTRAINT TestSetupsClockSyncProfileSlave_Constraint
DEFAULT 'None'
WITH VALUES;