﻿INSERT INTO [dbo].[Settings]
           ([PropertyId]
           ,[PropertyType]
           ,[PropertyValue]
           ,[UserId])
     VALUES
           ('EnableClockSourceSelect'
           ,2
           ,'False'
           ,'SYSTEM');

INSERT INTO [dbo].[DefaultProperties]
           ([PropertyId]
           ,[PropertyName]
           ,[DefaultValue])
     VALUES
           (407
           ,'DefaultCheckListClockSyncCheck'
           ,'True'),
		   (408
           ,'DefaultClockSyncProfileMaster'
           ,'None'),
		   (409
           ,'DefaultClockSyncProfileSlave'
           ,'None'),
		   (410
		   ,'AllowUARTRecordingModes'
		   ,'False'),
		   (411
		   ,'DefaultUARTBaudRate'
		   ,'57600'),
		   (412
		   ,'DefaultUARTDataBits'
		   ,'8'),
		   (413
		   ,'DefaultUARTStopBits'
		   ,'None'),
		   (414
		   ,'DefaultUARTParity'
		   ,'None'),
		   (415
		   ,'DefaultUARTFlowControl'
		   ,'None'),
		   (416
		   ,'DefaultUDPStreamProfile'
		   ,'CH10_MANUAL_CONFIG'),
		   (417
		   ,'DefaultUDPStreamTimeChannelId'
		   ,'1'),
		   (418
		   ,'DefaultUDPStreamDataChannelId'
		   ,'3'),
		   (419
		   ,'DefaultUDPStreamTmNSConfig'
		   ,'(1,6,60,0,0,0,0,0)'),
		   (420
		   ,'DefaultIRIGTimeDataPacketIntervalMs'
		   ,'500'),
		   (421
		   ,'DefaultAutoArmRepeatEnable'
		   ,'False'),
		   (422
		   ,'DefaultAutoArmPreserveDiagnostics'
		   ,'False');