﻿INSERT INTO [dbo].[ChannelSettings] ([SettingName], [DefaultValue]) VALUES 
('StreamOutUDPProfile', 'CH10_MANUAL_CONFIG'),
('StreamOutUDPAddress', 'UDP://239.1.2.10:8400'),
('StreamOutUDPTimeChannelId', '1'),
('StreamOutUDPDataChannelId', '3'),
('StreamOutUDPTmNSConfig', '(1,6,60,0,0,0,0,0)'),
('StreamOutIRIGTimeDataPacketIntervalMs', '500')