ALTER TABLE dbo.TestSetups ADD [WakeUpMotionTimeout] INT NULL DEFAULT 1;
ALTER TABLE dbo.TestSetups ADD [WakeUpMagnetTimeout] INT NULL DEFAULT 1000;
ALTER TABLE dbo.TestSetups ADD [WakeUpTimeSessionStart] DATETIME NULL DEFAULT CURRENT_TIMESTAMP;
ALTER TABLE dbo.TestSetups ADD [WakeUpTimeDuration] BIGINT NULL DEFAULT 0;