﻿INSERT INTO [dbo].[DefaultProperties] (
[PropertyId], 
[PropertyName], 
[DefaultValue]) 
VALUES 
(435, 'DefaultEmbeddedLowGLinearAccelerometerSampleRate', '6400'), 
(436, 'DefaultEmbeddedHighGLinearAccelerometerSampleRate', '5120'), 
(437, 'DefaultEmbeddedAngularAccelerometerSampleRate', '1600'), 
(438, 'DefaultEmbeddedAngularAccelerometerAndRateSensorSampleRate', '5120'), 
(439, 'DefaultEmbeddedAtmosphericSensorSampleRate', '157'), 
(440, 'DefaultBatterySaverMode', 'False'), 
(441, 'DefaultWakeMethod', 'None'), 
(442, 'DefaultMotionDetectDelayMs', '100'), 
(443, 'DefaultMotionQualificationPeriodMs', '100'), 
(444, 'DefaultMotionDetectInactivityS', '10'), 

(447, 'DefaultTimeSessionDuration', '0'), 

(449, 'DefaultMagnetDetectDelayMs', '100'), 
(450, 'DefaultMagnetTimeoutS', '1'), 
(451, 'DefaultEmbeddedLowGLinearAccelerometerTrigger', 'False'),
(452, 'DefaultEmbeddedLowGLinearAccelerometerTriggerAboveAndBelow', '5'),
(453, 'DefaultEmbeddedHighGLinearAccelerometerTrigger', 'False'),
(454, 'DefaultEmbeddedHighGLinearAccelerometerTriggerAboveAndBelow', '100'),
(455, 'DefaultEmbeddedAngularAccelerometerTrigger', 'False'),
(456, 'DefaultEmbeddedAngularAccelerometerTriggerAboveAndBelow', '100'),
(457, 'DefaultEmbeddedAngularRateSensorTrigger', 'False'),
(458, 'DefaultEmbeddedAngularRateSensorTriggerAboveAndBelow', '100'),
(459, 'DefaultEmbeddedTemperatureTrigger', 'False'),
(460, 'DefaultEmbeddedTemperatureTriggerAbove', '37'),
(461, 'DefaultEmbeddedTemperatureTriggerBelow', '100'),
(462, 'DefaultEmbeddedHumidityTrigger', 'False'),
(463, 'DefaultEmbeddedHumidityTriggerAbove', '25'),
(464, 'DefaultEmbeddedHumidityTriggerBelow', '50'),
(465, 'DefaultEmbeddedPressureTrigger', 'False'),
(466, 'DefaultEmbeddedPressureTriggerAbove', '5'),
(467, 'DefaultEmbeddedPressureTriggerBelow', '10'),
(468, 'DefaultTimedIntervalTrigger', 'False'),
(469, 'DefaultTimedIntervalFrequency', '100'),
(470, 'DefaultTimedIntervalUnit', 'Seconds'),
(471, 'DefaultTimedIntervalEventDurationMs', '1000'),
(472, 'DefaultTimedIntervalNumberOfEvents', '100'),
(473, 'DefaultRTCScheduleTrigger', 'False'),
(474, 'DefaultRTCScheduleStartTime', ''),
(475, 'DefaultRTCScheduleDuration', '0')