﻿
INSERT INTO [dbo].[Settings]
           ([PropertyId]
           ,[PropertyType]
           ,[PropertyValue]
           ,[UserId])
     VALUES
           ('SLICE6_AIR_PowerSetting'
           ,2
           ,'7.8,9,6.8,9,7.6,15.3,6.5,15.3,4,4,9,19,8.4,7.9,11.8,10.9'
           ,'SYSTEM'),
           ('UseFlatFolders'
           ,2
           ,'False'
           ,'SYSTEM');

UPDATE [dbo].[DAS]
	SET MinSampleRate = 50, MaxSampleRate = 400000
	WHERE SerialNumber = 'SLICE6 Prototype'

DECLARE @dasID int;

INSERT INTO [dbo].[DAS]
           ([SerialNumber]
           ,[Type]
           ,[MaxModules]
           ,[MaxMemory]
           ,[MaxSampleRate]
           ,[MinSampleRate]
           ,[FirmwareVersion]
           ,[CalDate]
           ,[ProtocolVersion]
           ,[LastModified]
           ,[LastModifiedBy]
           ,[Version]
           ,[LocalOnly]
           ,[LastUsed]
           ,[LastUsedBy]
           ,[Connection]
           ,[Channels]
           ,[Position]
           ,[ChannelTypes]
           ,[Reprogramable]
           ,[Reconfigurable]
           ,[IsModule]
           ,[PositionOnDistributor]
           ,[PositionOnChain]
           ,[Port]
           ,[ParentDAS])
     VALUES
           ('SLICE6 AIR Prototype'	
           ,36	
           ,2	
           ,1360003054	
           ,400000	
           ,50	
           ,'00A1'	
           ,'1970-01-01 00:00:00.000'	
           ,1	
           ,'2017-05-18 14:26:22.000'	
           ,'DATAPRO_SYSTEM'	
           ,1	
           ,0	
           ,'1753-01-01 00:00:00.000'			
           ,''
		   ,''
		   ,6	
           ,'Prototype'	
           ,'0,0,0,0,0,0'	
           ,0	
           ,0	
           ,0	
           ,0	
           ,0	
           ,0
           ,'');

SET @dasID = CAST(SCOPE_IDENTITY() as int);

INSERT INTO [dbo].[DASChannels]
           ([DASId]
           ,[ChannelIdx]
           ,[SupportedBridges]
           ,[SupportedExcitations]
           ,[DASDisplayOrder]
           ,[LocalOnly]
           ,[SupportedDigitalInputModes]
           ,[SupportedSquibFireModes]
           ,[SupportedDigitalOutputModes]
           ,[ModuleSerialNumber]
           ,[SettingId]
           ,[ModuleArrayIndex])
     VALUES
           (@dasID
           ,0	
           ,9	
           ,50	
           ,-1	
           ,0	
           ,30	
           ,1	
           ,10	
           ,''	
           ,0	
           ,0),
           (@dasID
           ,1	
           ,9	
           ,50	
           ,-1	
           ,0	
           ,30	
           ,1	
           ,10	
           ,''	
           ,0	
           ,0),
           (@dasID
           ,2	
           ,9	
           ,50	
           ,-1	
           ,0	
           ,30	
           ,1	
           ,10	
           ,''	
           ,0	
           ,0),
           (@dasID
           ,3	
           ,9	
           ,50	
           ,-1	
           ,0	
           ,30	
           ,1	
           ,10	
           ,''	
           ,0	
           ,0),
           (@dasID
           ,4	
           ,9	
           ,50	
           ,-1	
           ,0	
           ,30	
           ,1	
           ,10	
           ,''	
           ,0	
           ,0),
           (@dasID
           ,5	
           ,9	
           ,50	
           ,-1	
           ,0	
           ,30	
           ,1	
           ,10	
           ,''	
           ,0	
           ,0);
